LIBRARY msvcrt.dll

VERSION 1.0

EXPORTS
      _close
      _lseek
      _read
      _write
      __dllonexit
      __mb_cur_max
      _assert
      _errno
      _ftime
      _iob
      _isctype
      _lseeki64
      _open
      _snprintf
      _stricmp
      _strnicmp
      _vsnprintf
      abort
      atof
      atoi
      cos
      cosh
      exp
      fflush
      floor
      fprintf
      free
      frexp
      fwrite
      gmtime
      ldexp
      localtime
      log
      log10
      malloc
      memcpy
      memmove
      memset
      mktime
      perror
      printf
      putchar
      puts
      qsort
      realloc
      sin
      sinh
      sprintf
      sqrt
      sscanf
      strchr
      strcmp
      strcpy
      strlen
      strncpy
      strrchr
      strtod
      strtok
      strtol
      strtoul
      tan
      tanh
      time
      toupper
      _memccpy
      _fstat
      _memccpy
      _mkdir
      _pclose
      _popen
      _sleep
      _stat
      _strdup
      _swab
      _findclose
      _findfirst
      _findnext
      _fullpath
      _pctype
      calloc
      ceil
      ctime
      exit
      fclose
      feof
      fgets
      fopen
      fputc
      fputs
      fread
      fseek
      ftell
      getc
      getenv
      putc
      rand
      remove
      rewind
      setlocale
      signal
      srand
      strcat
      strcoll
      strerror
      strncat
      strncmp
      strpbrk
      strstr
      tolower
      strspn
      strcspn
      fsetpos
      fgetpos
      _fstati64
      _stati64
      _tell
      _telli64
      _setmode